Copyright: © 2005 ЗАО АСКОН, Россия
Citation: Библиотека «Трубная решетка»


Назначение библиотеки
Назначение библиотеки «Трубная решетка»

Библиотека предназначена для построения изображения трубных решеток. Исходными данными, задаваемыми пользователем, являются:

•	диаметр аппарата;

•	тип решетки (плавающая или неподвижная);

•	вид разбивки (треугольная или квадратная);

•	параметры трубок (диаметр и длина);

•	шаг решетки.

Результатом работы библиотеки является изображение рассчитанной трубной решетки, которое автоматически вставляется в активный графический документ КОМПАС-ГРАФИК в виде макроэлемента.

Предусмотрена возможность вынесения на лист чертежа информации о номере ряда и о количестве отверстий в каждом ряду. Построенная решетка может корректироваться пользователем с помощью встроенного редактора.

Автоматически выполняется подсчет количества трубок и площади теплообмена.

Для удобства работы элементы рабочего окна библиотеки «Трубная решетка» снабжены ярлычками-подсказками.

______________

Смотрите также

Интерфейс библиотеки

Создание изображения трубной решетки

Редактирование изображения трубной решетки


Интерфейс библиотеки

Окно библиотеки «Трубная решетка» состоит из заголовка, инструментальной панели, двух вкладок для ввода параметров решеток и информационной строки.

Инструментальная панель содержит следующие кнопки:

  Кнопка Отрисовать трубную решетку

  Кнопка Удалить отверстия

  Кнопка Добавить отверстия

  Кнопка Отрисовать расположение отверстий

  Кнопка Отрисовать информацию: номер ряда — количество отверстий

  Кнопка Сохранить координаты центров отверстий трубной решетки в текстовый файл

  Кнопка Справка

  Кнопка Выход из библиотеки

На вкладке Параметры решетки задаются:

•	диаметр условного прохода;

•	величина условного давления;

•	тип решетки;

•	тип разбивки;

•	диаметр и длина трубок;

•	смещение шага решетки.

Автоматически определяются диаметр границы и шаг решетки.

На вкладке Настройка задаются параметры редактирования решетки — выполнение действий с одним отверстием или с целым рядом, с учетом симметрии или без учета, относительно какой оси.

В нижней части окна библиотеки отображается информационная строка, состоящая из двух полей, в которых отображаются количество отверстий в решетке (N) и площадь поверхности теплообмена (F).


Создание изображения трубной решетки

Для работы с библиотекой «Трубная решетка» необходимо наличие в окне КОМПАС-ГРАФИК активного графического документа (листа чертежа или фрагмента).

1.	На вкладке Параметры решетки укажите значение диаметра условного прохода Dу (диаметра аппарата по ГОСТ 12821-80 или ГОСТ 28759-3-90). Для этого щелкните мышью на поле ввода или нажмите кнопку со стрелкой в его правой части и выберите нужную строку из предлагаемого списка.

Если диаметр равен 150, 250, 300, то расположение крепежных отверстий будет соответствовать ГОСТ 12821-80, если диаметр превышает 300 мм — ГОСТ 28759-3-90.

По введенным данным будет определена величина диаметра границы решетки Dо.

Внимание! Если после ввода диаметра условного прохода в строке Диаметр границы решетки Dо не появилось значение, необходимо сменить тип решетки.

 2.	Если диаметр условного прохода Dу более 300 мм, то выберите значение условного давления из предлагаемого стандартного ряда.

3.	В группе опций Тип решетки выберите тип решетки:

- неподвижная, если решетка жестко закреплена в корпусе;

- плавающая, если решетка имеет возможность перемещаться в случае температурного расширения трубок.

Если будет выбран вариант, не соответствующий ГОСТ, вместо названия панели появится сообщение «Смените тип решетки».

4.	В группе опций Тип разбивки выберите нужный тип.

Типы разбивки

5.	Выберите значение диаметра трубок.

После задания значения диаметра трубок будет автоматически определена величина шага решетки. На инструментальной панели станет доступной кнопка Отрисовать трубную решетку, и вы получите возможность вставить изображение решетки в документ.

 Кнопка Отрисовать трубную решетку

6.	Введите длину трубок.

7.	Задайте шаг решетки. Как только вы измените прдлагаемое значение линейного шага, станет доступным для редактирования значение углового шага.

8.	При необходимости включите опцию Шаг со смещением. В этом случае отверстия в трубной решетке будут расположены так, что ни у одного из них центр не будет совпадать с геометрическим центром решетки.

9.	Если требуется отобразить на чертеже лицевую часть решетки, включите опцию Отрисовать лицевую часть.

10.	Нажмите на инструментальной панели кнопку Отрисовать трубную решетку.

Рабочее окно библиотеки будет свернуто, а в окне документа появится фантом изображения рассчитанной трубной решетки.

 11.	Укажите точку привязки решетки в графическом документе.

Рабочее окно библиотеки раскроется, в информационной строке будут показаны сведения о количестве отверстий в решетке и площади теплообмена.

После построения трубной решетки появляется ряд дополнительных возможностей:

редактирование решетки;

отрисовка расположения отверстий;

отрисовка информации о номере ряда и количестве отверстий;

сохранение координат центров отверстий трубной решетки в текстовый файл.


Редактирование изображения трубной решетки

Чтобы отредактировать изображение трубной решетки, выполните следующее.

 1.	На вкладке Настройка укажите, как будут редактироваться отверстия — по одному или рядами.

2.	Укажите, должны ли преобразования решетки быть асимметричными или симметричными относительно оси решетки (горизонтальной или вертикальной).

3.	Чтобы после редактирования решетки можно было заново указать положение ее точки привязки, включите опцию Указывать новое положение при отрисовке.

4.	На инструментальной панели нажмите кнопку Удалить отверстия, если предполагается удалить изображения некоторых отверстий, или кнопку Добавить отверстия, если изображения отверстий будут добавлены.

Примечание. Если решетка еще не редактировалась, кнопка Добавить отверстия будет недоступна.

 Кнопка Удалить отверстия

 Кнопка Добавить отверстия

Окно библиотеки будет свернуто.

5.	Если вы выбрали работу с одиночным отверстием, укажите курсором окружность, которая подлежит удалению, или точку, в которую нужно поместить центр добавляемой окружности. Эта операция может повторяться неоднократно.

Для возвращения к работе с окном библиотеки нажмите клавишу <Esc> или кнопку Прервать команду на панели специального управления КОМПАС-ГРАФИК.

 Кнопка Прервать команду

Если вы выбрали работу с рядом отверстий, укажите курсором начало и конец отрезка, задающего ряд. При удалении ряда будут стерты только те окружности, центры которых находятся на этом отрезке. При добавлении ряда будут дорисованы окружности с центрами, образованными пересечением заданного отрезка с линиями сетки построенной трубной решетки. После выполнения операции работа автоматически продолжается с окном библиотеки.

Чтобы после редактирования обновить отображаемую на экране информацию о номере ряда и количестве отверстий, нажмите кнопку Отрисовать информацию: номер ряда — количество отверстий.

  Кнопка Отрисовать информацию: номер ряда — количество отверстий

Если вы хотите внести изменения в изображение трубной решетки, сформированное в предыдущих сеансах работы с библиотекой, дважды щелкните на нем левой кнопкой мыши. На экране появится окно библиотеки.


Отрисовка расположения отверстий

Чтобы отобразить на поле чертежа ячейку сетки трубной решетки с необходимыми размерами, нажмите кнопку Отрисовать расположение отверстий на инструментальной панели и расположите появившийся фрагмент в графическом документе.

 Кнопка Отрисовать расположение отверстий

Фрагмент ячейки трубной решетки создается в отдельном виде чертежа в масштабе 1:1.


Отрисовка информации
Отрисовка информации о номере ряда

и количестве отверстий на трубной решетке

Для отрисовки номера ряда отверстий и количества отверстий в ряду нажмите кнопку Отрисовать информацию: номер ряда — количество отверстий на инструментальной панели.

 Кнопка Отрисовать информацию: номер ряда — количество отверстий


Сохранить координаты центров отверстий трубной решетки в текстовый файл
Сохранение координат

центров отверстий трубной решетки в текстовый файл

Вы можете создать текстовый файл (*.txt) c координатами центров отверстий трубной решетки.

Настройка параметров записи производится в группе опций Запись данных на вкладке Настройка окна библиотеки.

После настройки параметров нажмите кнопку Сохранить координаты центров отверстий трубной решетки в текстовый файл.

  Кнопка Сохранить координаты центров отверстий трубной решетки в текстовый файл

На экране появится стандартный диалог записи файлов. Задайте нужное имя и путь для записи документа и нажмите кнопку Сохранить.


Инструментальная панель

На инструментальной панели расположены кнопки вызова команд библиотеки «Трубная решетка».


Информационная строка

В информационной строке окна библиотеки «Трубная решетка» отображаются справочные сведения о спроектированной решетке:

•	N — количество отверстий в решетке (шт.);

•	F — площадь поверхности теплообмена (кв.м.).


Окно библиотеки
Окно библиотеки «Трубная решетка»

Вкладка Параметры решетки

На этой вкладке вводятся данные о диаметре условного прохода, о величине условного давления, указывается тип решетки, тип разбивки, диаметр и длина трубок и, при необходимости, смещение шага решетки. Диаметр границы и шаг решетки определяются библиотекой автоматически.

Проход условный Dу, мм

Выберите значение диаметра условного прохода Dу (диаметра аппарата по ГОСТ 12821-80 или ГОСТ 28759-3-90) из списка.

Если диаметр равен 150, 250, 300, то расположение крепежных отверстий будет соответствовать ГОСТ 12821-80; если диаметр больше 300 мм — ГОСТ 28759-3-90.

Диаметр границы решетки Dо, мм

Это значение рассчитывается автоматически.

Внимание! Если после ввода диаметра условного прохода в строке Диаметр границы решетки Dо, мм не появилось значение, необходимо сменить тип решетки.

Давление условное Ру, МПа

Если диаметр условного прохода более 300 мм, выберите значение условного давления из списка.

Тип решетки

В этой группе опций вы можете указать тип решетки:

-	неподвижная, если решетка жестко закреплена в корпусе;

-	плавающая, если решетка имеет возможность перемещаться в случае температурного расширения трубок.

Если будет выбран вариант, не соответствующий ГОСТ, вместо названия панели появится сообщение: «Смените тип решетки».

Тип разбивки

В этой группе опций вы можете указать тип разбивки: треугольная или квадратная.

Диаметр трубки

Выберите значение диаметра трубок решетки из списка.

Длина трубки

Введите в это поле длину трубок решетки в миллиметрах.

Решетка, шаг

Введите линейный шаг решетки в миллиметрах. После этого скорректируйте угловой шаг в градусах.

Шаг со смещением

Включите эту опцию, если отверстия в трубной решетке должны располагаться так, так, чтобы ни у одного из них центр не совпадал с геометрическим центром решетки.

Отрисовать лицевую часть

Включите эту опцию, если требуется вставить в документ изображение лицевой части решетки.

После настройки параметров трубной решетки нажмите кнопку Отрисовать трубную решетку на инструментальной панели для вставки в документ ее изображения.

  Кнопка Отрисовать трубную решетку

После того, как в документе создано изображение решетки, вы можете отрисовать расположение отверстий и информацию о номере ряда и количестве отверстий. Для этого нажмите соответствующую кнопку на инструментальной панели.

  Кнопка Отрисовать расположение отверстий

  Кнопка Отрисовать информацию: номер ряда — количество отверстий

Вы можете также перейти к редактированию созданного изображения или к сохранению координат центров отверстий трубной решетки в виде текстового файла. Параметры редактирования настраиваются на вкладке Настройка.

Вкладка Настройка

Эта вкладка содержит группы опций, управляющих редактированием изображения трубной решетки в чертеже и параметрами записи координат центров отверстий в текстовый файл.

Включение в различных сочетаниях опций из группы Редактор позволит вам выполнять корректирующие действия с одним отверстием или с целым рядом, с учетом симметрии или без учета, относительно горизонтальной или вертикальной оси.

Отверстие

Включите эту опцию, если требуется удалять или добавлять отверстия по одному.

Ряд

Включите эту опцию, если требуется удалять или добавлять отверстия рядами.

Без симметрии

Включите эту опцию, если преобразования трубной решетки (удаление или добавление отверстий) должны быть асимметричны.

Горизонтальная ось

Включите эту опцию, если требуется произвести преобразования трубной решетки симметрично относительно ее горизонтальной оси.

Вертикальная ось

Включите эту опцию, если требуется произвести преобразования трубной решетки симметрично относительно ее вертикальной оси.

Для добавления отверстий нажмите кнопку Добавить отверстия на инструментальной панели, для удаления — Удалить отверстия.

Если решетка еще не редактировалась, кнопка Добавить отверстия будет недоступна.

  Кнопка Добавить отверстия

  Кнопка Удалить отверстия

Система перейдет в режим редактирования решетки. Укажите курсором отверстия (ряды отверстий), подлежащие удалению, или точки (ряды точек) расположения добавляемых отверстий.

Для выхода из режима редактирования и возвращения к работе с библиотекой нажмите клавишу <Esc> или кнопку Прервать команду на панели специального управления КОМПАС-ГРАФИК.

  Кнопка Прервать команду

Группа опций Запись данных позволяет настроить параметры записи координат центров отверстий трубной решетки в текстовый файл.

Рядами

Включите эту опцию, если координаты центров отверстий трубной решетки должны быть записаны в текстовый файл в виде строк, соответствующих рядам отверстий в решетке. При такой настройке количество строк в текстовом файле будет равно количеству рядов в решетке. В каждой строке будут записаны координаты центров отверстий соответствующего ряда.

По номеру отверстия

Включите эту опцию, если координаты центров отверстий трубной решетки должны быть записаны в текстовый файл так, чтобы каждая его строка содержала координаты одного отверстия. При такой настройке количество строк в текстовом файле будет равно количеству отверстий в решетке.

После включения опции По номеру отверстия станут доступны остальные опции группы.

Обозначение номера отверстия

Выберите обозначение номера отверстия из предлагаемого списка.

Разделитель координат

Выберите разделитель координат из списка.

Вид записи координат

Выберите вид записи координат:

•	00,00 – координаты записываются с точностью до одной сотой;

•	00,000 – координаты записываются с точностью до одной тысячной;

•	X00,00 – записываются названия координат (X, Y, Z) и их значения с точностью до одной сотой;

•	X00,000 – записываются названия координат (X, Y, Z) и их значения с точностью до одной тысячной.

Координата Z

Включите эту опцию, если в текстовый файл кроме координат X и Y нужно записать координату Z центров отверстий, и введите ее значение в поле справа от опции. При выключенной опции поле недоступно.

Для создания текстового файла нажмите кнопку Сохранить координаты центров отверстий трубной решетки в текстовый файл на инструментальной панели.

  Кнопка Сохранить координаты центров отверстий трубной решетки в текстовый файл

На экране появится стандартный диалог записи файлов. Задайте нужное имя и путь для записи документа и нажмите кнопку Сохранить.

Высота шрифта, мм

Выберите высоту шрифта из предлагаемого списка или введите значение с клавиатуры. Шрифтом с заданной вами высотой будет отрисовываться информация о номере ряда и количестве отверстий трубной решетки.

Чтобы после изменения высоты шрифта обновить отображаемую на экране информацию о номере ряда и количестве отверстий нажмите кнопку Отрисовать информацию: номер ряда — количество отверстий.

  Кнопка Отрисовать информацию: номер ряда — количество отверстий

Указывать новое положение при отрисовке

Чтобы после редактирования параметров решетки можно было заново указать положение ее точки привязки, включите эту опцию.

______________

Смотрите также

Общие сведения о библитеке

Интерфейс библиотеки

Создание изображения трубной решетки

Редактирование изображения трубной решетки