FTSCalc - Простейший калькулятор

 Данный калькулятор предназначен для выполнения простейших вычислений.

Вы можете ввести любое допустимое выражение в основном окне калькулятора, например :

23+Sqrt(34.5)-sind(23)

Далее достаточно нажать кнопку "Посчитать" или клавишу "=" и вы увидите результат

28.482939 в окне результата.

Ввести функцию вы можете нажав клавишу "F2" или правую кнопку мыши.

Допускаемые функции калькулятора

Если вы пожелаете, то сможете использовать 9 регистровых переменных.

Например введя в поле "R1" 23.5 , а в поле "R4" 12 вы можете написать выражение типа

(R1+12)/(R4-Sqrt(5))  полученный результат будет  3.63583

Полученный результат в виде строки может быть скопирован в Clipboard (буфер) Windows (Клавиша "Копировать").


Допускаемые функции
abs	- Абсолютное значение

sqrt	- Квадратный корень

 X^n	- Возведение в степень

exp	- Экспонента

ln	- Натуральный логарифм

lg	- Десятичный логарифм

cos	- Косинус (аргумент в радианах)

cosd	- Косинус (аргумент в градусах)

sin	- Синус (аргумент в радианах)

sind	- Синус (аргумент в градусах)

tg	- Тангенс (аргумент в радианах)

tgd	- Тангенс (аргумент в градусах)

atg	- Арктангенс (значение в радианах)

atd	- Арктангенс (значение в градусах)

asin	- Арксинус (значение в радианах)

asd	- Арксинус (значение в градусах)

acos	- Арккосинус (значение в радианах)

acd	- Арккосинус (значение в градусах)

rad	- Преобразование из градусов в радианы

grad	- Преобразование из радианов в градусы

PI	- Значение числа ПИ (3.1415926)

Inv	- Инволюта (значение в радианах)

ArcInv	- Аркинволюта (значение в радианах)

InvD	- Инволюта (значение в градусах)

ArcInvD	- Аркинволюта (значение в градусах)