Copyright: ©АСКОН 2002
Citation: ©АСКОН 2002


Общие сведения о библиотеке

Общие сведения о библиотеке канавок для КОМПАС-3D

Библиотека предназначена для построения на наружных и внутренних цилиндрических поверхностях трехмерных твердотельных моделей КОМПАС-3D канавок следующих типов:

•	канавка прямоугольная;

•	канавка трапециевидная;

•	канавка сферическая;

•	канавка для уплотнительных колец (ГОСТ 9833-73);

•	канавка для выхода резьбы (ГОСТ 10549-80);

•	канавка для выхода шлифовального круга (ГОСТ 8820-69);

•	канавка для выхода долбяка (ГОСТ 14775-81);

•	канавка по ГОСТ 13940-86, ГОСТ 13941-86, ГОСТ 13942-86, ГОСТ 13943-86;

•	проточка для запорных колец (МН 470-61).

Перед началом работы с библиотекой канавок должен быть открыт документ с изображением детали.

После активизации библиотеки пользователю предлагается выбрать вид канавки, поверхность и базовую грань для построения, задать геометрические размеры канавки.

Во время работы с библиотекой канавок пользователь имеет возможность управлять изображением  детали в окне, выбирая наиболее удобный для указания поверхностей ракурс.

После ввода всех необходимых данных на указанной поверхности детали будет построена канавка с заданными параметрами.

Модели, построенные с помощью библиотеки канавок, доступны для последующего редактирования обычными средствами КОМПАС-3D.


Общие приемы работы с библиотекой

Для построения на цилиндрической поверхности детали канавки дважды щелкните мышкой (или нажмите клавишу <Enter>) на названии необходимого типа канавки в окне Библиотека канавок. для КОМПАС-3D . Окно библиотеки свернется. Укажите на модели цилиндрическую поверхность, на которой должна находиться канавка, и нажмите левую клавишу мыши (или клавишу <Enter>) .

Указанная поверхность будет выделена цветом. В открывшемся окне диалога  расположена схема канавки, поля ввода параметров для построения, справочная информация. Введите или выберите из предлагаемых списков необходимые параметры.

ПРИМЕЧАНИЕ.    Введенные значения геометрических параметров, при которых не может быть построена канавка, будут выделены красным цветом и подлежат обязательному исправлению.

Нажмите кнопку Указать грань. Окно библиотеки свернется. Щелкните левой клавишей мыши (или нажмите клавишу <Enter>) на плоской грани модели, которая будет определять расположение канавки.

ПРИМЕЧАНИЕ.    Поверхность, на которой должна быть построена канавка, и базовая грань должны обязательно соприкасаться.

Базовая грань будет выделена цветом. Окно задания параметров восстановится. Если все введенные данные Вас устраивают, нажмите кнопку Ok или клавишу <Enter>. На  детали будет построена канавка.

_____________

Смотрите также:

Канавка прямоугольная;

Канавка трапециевидная;

Канавка сферическая;

Канавка для уплотнительных колец (ГОСТ 9833-73);

Канавка для выхода резьбы (ГОСТ 10549-80);

Канавка для выхода шлифовального круга (ГОСТ 8820-69);

Канавка для выхода долбяка (ГОСТ 14775-81);

Канавка по ГОСТ 13940-86, ГОСТ 13941-86, ГОСТ 13942-86, ГОСТ 13943-86;

Проточка для запорных колец (МН 470-61).


Канавка прямоугольная

Введите значения параметров, указанных на схеме. Руководствуйтесь приведенной в нижней части  диалогового окна  справочной информацией о диаметре базовой поверхности.

Нажмите кнопку Указать грань. На модели щелкните мышкой по базовой грани (или укажите ее курсором и нажмите клавишу <Enter>). Помните, что базовая грань должна обязательно соприкасаться с поверхностью, на которой будет строиться канавка.

Нажмите кнопку Ok.


Канавка трапециевидная

Введите значения параметров, указанных на схеме. Руководствуйтесь приведенной в нижней части диалогового окна  справочной информацией о диаметре базовой поверхности.

Нажмите кнопку Указать грань. На модели щелкните мышкой по базовой грани (или укажите ее курсором и нажмите клавишу <Enter>). Помните, что базовая грань должна обязательно соприкасаться с поверхностью, на которой будет строиться канавка.

Нажмите кнопку Ok.


Канавка сферическая

Введите значения параметров, указанных на схеме. Руководствуйтесь приведенной в нижней части  диалогового окна  справочной информацией о диаметре базовой поверхности.

Нажмите кнопку Указать грань. На модели щелкните мышкой по базовой грани (или укажите ее курсором и нажмите клавишу <Enter>). Помните, что базовая грань должна обязательно соприкасаться с поверхностью, на которой будет строиться канавка.

Нажмите кнопку Ok.


Канавка для уплотнительных колец

Канавка для уплотнительных колец (ГОСТ 9833-73)

Введите значения параметров L и Alfa, указанных на схеме.

Выберите из предлагаемых вариантов, какой из стандартных  диаметров вала нужно подобрать:

•	ближайший;

•	ближайший больший;

•	ближайший меньший.

Руководствуйтесь приведенной в нижней части диалогового окна  информацией о стандартных размерах  канавки для  данного диаметра вала.

Установите тип соединения - подвижное или неподвижное

Откройте список обозначений стандартных колец для подобранного диаметра вала и типа соединения и выберите вариант с удовлетворяющими Вас значениями параметров канавки.

Нажмите кнопку Указать грань. На модели щелкните мышкой по базовой грани (или укажите ее курсором и нажмите клавишу <Enter>). Помните, что базовая грань должна обязательно соприкасаться с поверхностью, на которой будет строиться канавка.

Нажмите кнопку Ok.


Канавка для выхода резьбы

Канавка для выхода резьбы (ГОСТ 10549-80)

Укажите тип резьбы:

•	метрическая;

•	трубная цилиндрическая;

•	трапецеидальная.

Выберите из предлагаемых вариантов, какой из стандартных  диаметров резьбы нужно подобрать:

•	ближайший;

•	ближайший больший;

•	ближайший меньший.

Руководствуйтесь приведенной в нижней части диалогового окна  информацией о стандартных размерах  канавки для  выхода данного типа и диаметра резьбы.

Для метрической резьбы установите шаг (крупный или мелкий) и тип проточки (нормальный, узкий, упрочненный). Для трубной - только тип проточки.

Выберите способ построения - без подреза грани или с подрезом грани.

ПРИМЕЧАНИЕ.  Если в окне, содержащем информацию о размерах канавки, рядом с наименованием параметра d (наружный диаметр резьбы) или p (шаг резьбы) появляется черный треугольник,  Вы можете установить значение этого параметра, взяв его из второго или третьего предлагаемого стандартом размерного ряда. Для этого нужно указать курсором значение параметра и нажать клавишу <Enter> или щелкнуть мышкой в поле значения параметра под черным треугольником. Далее следует нажать на появившуюся кнопку и выбрать значение из предлагаемого списка

Нажмите кнопку Указать грань. На модели щелкните мышкой по базовой грани (или укажите ее курсором и нажмите клавишу <Enter>). Помните, что базовая грань должна обязательно соприкасаться с поверхностью, на которой будет строиться канавка.

Нажмите кнопку Ok.


Канавка для выхода шлифовального круга

Канавка для выхода шлифовального круга (ГОСТ 8820-69)

Укажите тип шлифования:

•	по цилиндру (исполнение 1);

•	по цилиндру (исполнение 2);

•	по цилиндру  и торцу (исполнение 1);

•	по цилиндру  и торцу (исполнение 2);

•	по торцу.

Выберите способ построения - без подреза грани или с подрезом грани.

Руководствуйтесь приведенной в нижней части диалогового окна  информацией о стандартных размерах  канавки.

Нажмите кнопку Указать грань. На модели щелкните мышкой по базовой грани (или укажите ее курсором и нажмите клавишу <Enter>). Помните, что базовая грань должна обязательно соприкасаться с поверхностью, на которой будет строиться канавка.

Нажмите кнопку Ok.


Канавка для выхода долбяка

Канавка для выхода долбяка (ГОСТ 14775-81)

Введите модуль резьбы.

Выберите из предлагаемого списка угол наклона резьбы.

Укажите тип канавки.

Если деталь является валом-шестерней, включите соответствующую опцию

Руководствуйтесь приведенной в нижней части диалогового окна  информацией о стандартных размерах канавки для выхода долбяка.

Выберите способ построения - без подреза грани или с подрезом грани.

Нажмите кнопку Указать грань. На модели щелкните мышкой по базовой грани (или укажите ее курсором и нажмите клавишу <Enter>). Помните, что базовая грань должна обязательно соприкасаться с поверхностью, на которой будет строиться канавка.

Нажмите кнопку Ok.


Канавка по ГОСТ 13940-86, ГОСТ 13941-86, ГОСТ 13942-86, ГОСТ 13943-86

Укажите тип канавки.

Выберите из предлагаемых вариантов, какой из стандартных  диаметров канавки нужно подобрать:

•	ближайший;

•	ближайший больший;

•	ближайший меньший.

Введите значения параметров h и r, показанных на схеме.

Нажмите кнопку Указать грань. На модели щелкните мышкой по базовой грани (или укажите ее курсором и нажмите клавишу <Enter>). Помните, что базовая грань должна обязательно соприкасаться с поверхностью, на которой будет строиться канавка.

Нажмите кнопку Ok.


Проточка для запорных колец

Проточка для запорных колец  (МН 470-61)

Выберите из предлагаемых вариантов, какой из стандартных  диаметров канавки нужно подобрать:

•	ближайший;

•	ближайший больший;

•	ближайший меньший.

Введите значения параметра t, показанного на схеме.

Нажмите кнопку Указать грань. На модели щелкните мышкой по базовой грани (или укажите ее курсором и нажмите клавишу <Enter>). Помните, что базовая грань должна обязательно соприкасаться с поверхностью, на которой будет строиться канавка.

Нажмите кнопку Ok.