Copyright: Ulead Photo Capture Device Help
Citation: Copyright (c) 1996 Ulead Systems, All rights reserved


Solución de problemas y consejos
Solución de problemas y consejos para adquirir imágenes.

La experiencia es el mejor maestro para enseñarle a adquirir imágenes para su ordenador. Experimentando con diversas técnicas y configuraciones de escáneres y cámaras aprenderá a producir imágenes de excelente calidad con gran eficiencia y facilidad.

  Consejos para digitalizar

  Consejos para usar una cámara digital

  Después de que tengo la imagen, quiero...

  Guía de solución de problemas del escáner

  Guía de solución de problemas de la cámara digital


De ser posible limite el tamaño de la imagen

Las imágenes pequeñas requieren mucho menos espacio en disco y tiempo de procesado que las grandes. Cuando vaya a tomar fotografías tenga en consideración cuánto espacio en disco disponible hay en su sistema. Si el espacio en disco disponible es limitado, probablemente podrá copiar pocas fotos de su cámara al ordenador. Algunas cámaras le permiten ajustar la compresión de fotos antes de tomar las fotografías.

Aumentando la compresión obtendrá tamaños de archivo menores. Con ello podrá almacenar más fotos en la cámara (como si tuviera un rollo de película más largo) y copiar más a su ordenador. Sin embargo, sus imágenes no tendrán tanta precisión o no serán tan nítidas como las imágenes de menor compresión.

{button ,ALink(pho, 0, ””, troub)} Otros consejos para fotografiar


De ser posible limite el tamaño de la imagen

Las imágenes pequeñas requieren mucho menos espacio en disco y tiempo de procesado que las grandes. Antes de empezar a digitalizar con el escáner tome nota del tamaño de archivo en KB predicho (kilobytes) y compárelo con el espacio en disco disponible. Si el tamaño de archivo que se espera tenga la imagen digitalizada es mayor que el espacio en disco disponible el proceso de digitalización dará un error. Para controlar el tamaño del archivo, antes de digitalizar asegúrese de seleccionar solamente el área que desea guardar. Otras cosas que puede hacer para limitar el tamaño del archivo son:

1. 	Si su escáner soporta Agudizar, pruebe a digitalizar a una resolución más baja a efecto de agudizar.

2. 	Guarde imágenes de color verdadero o escala de grises como archivos JPEG (*.JPG).

Nota: Aunque iPhoto Plus 4 puede leer archivos de mapas de bits y de vectores, sólo se pueden guardar archivos en formato de mapas de bits.

{button ,ALink(Reference, 0, ””, troub)} Otros consejos para digitalizar con escáner


Digitalice con el mismo color que usa la unidad de salida.
Digitalice con el mismo color que usa el dispositivo de salida.

Para lograr una reproducción más exacta, digitalice sus imágenes usando el formato requerido por la unidad de salida que va utilizar. Esto probablemente también ayude a controlar el tamaño del archivo. Por ejemplo:

  	Texto OCR Blanco y negro.

  	Dibujo lineal Blanco y negro.

  	Impresora de láser Escala de grises.

  	Monitor 256 colores o Color verdadero (dependiendo del controlador de vídeo).

  	Postproducción Color verdadero (CMYK).

{button ,ALink(Reference, 0, ””, troub)} Otros consejos para digitalizar con escáner


Digitalice imágenes y textos de buena calidad

Siempre se pierde algo de información al digitalizar con el escáner. Sin embargo, si selecciona cuidadosamente las imágenes y la configuración puede minimizar los problemas. Por ejemplo, no trate de digitalizar imágenes demasiado claras, demasiado oscuras o con poco contraste.

{button ,ALink(Reference, 0, ””, troub)} Otros consejos para digitalizar con escáner


Evite fotografiar documentos o bloques de texto extensos.

Si desea copiar un documento impreso o páginas de un libro, use el escáner en vez de la cámara. Las cámaras digitales, por lo general, no pueden grabar la imagen adecuadamente con suficientes datos como para que el resultado sea legible porque:

  	La resolución probablemente es demasiado baja.

  	La lente es muy pequeña.

  	La mayoría de las cámaras digitales guardan las fotos usando un método de compresión deficiente.

{button ,ALink(pho, 0, ””, troub)} Otros consejos para digitalizar con escáner


Digitalice fotografías en vez de imágenes impresas.

Las imágenes de revistas o libros están compuestas de pequeños puntos. La resolución típica usada en tipografía es de 180 ó 300 ppp, así es que el digitalizar con una mayor resolución no produce mejores resultados. En efecto, el resultado podrá incluso ser peor. Con frecuencia el escáner ve puntos blanco entre los puntos de color impresos. Para preservar los detalles de los tonos, digitalice fotografías en vez de material impreso.

{button ,ALink(Reference, 0, ””, troub)} Otros consejos para digitalizar con escáner


La resolución más alta no es siempre la mejor.

Las imágenes con alta resolución ocupan cantidades inmensas de espacio. Si la imagen se digitaliza en escáner con una resolución mayor que la que se utilizará en pantalla, no significa que el resultado vaya a ser mejor. La resolución de composición tipográfica de color estándar es de 180 ppp y la de fotografía oscila entre 400 y 600 ppp. Igualmente, una resolución más alta que la del dispositivo de salida o monitor, no dará una imagen de calidad superior. La resolución de visualización estándar de los monitores VGA en Windows es de 72 ppp (Fuentes grnades) o 96 ppp (Fuentes pequeñas).

{button ,ALink(Reference, 0, ””, troub)} Otros consejos para digitalizar con escáner


Experimente con diferentes configuraciones

Digitalice imágenes utilizando diferentes configuraciones. Compare los resultados en la pantalla para seleccionar la configuración más adecuada a sus necesidades. iPhoto Plus 4 dispone de muchas funciones para ayudarle a mejorar las imágenes digitalizadas hasta quedar satisfecho con los resultados.

{button ,ALink(Reference, 0, ””, troub)} Otros consejos para digitalizar con escáner


Si tiene problemas para hacer funcionar a su escáner con iPhoto Plus 4...

Asegúrese de que el controlador TWAIN (suministrado por su proveedor) esté instalado correctamente antes de utilizar iPhoto Plus 4 para adquirir imágenes. El controlador TWAIN envía el comando de adquirir desde la aplicación al escáner, procesa los datos digitalizados y envía a la aplicación. Debe seleccionar también el origen de los datos antes de iniciar el proceso de digitalización. Puede haber más de un dispositivo de origen conectado a su ordenador, por ello deberá especificar cuál va ser utilizado. Estos son los primeros pasos:

1. 	Compruebe si el escáner está enchufado y encendido.

2. 	Asegúrese de que no haya ninguna conexión suelta entre su ordenador y el escáner. Intente digitalizar de nuevo.

3. 	Si todavía no funciona, seleccione ”Adquirir: Seleccionar origen” de el menú Archivo de iPhoto Plus 4.

4. 	Mire si el nombre del modelo de su escáner aparece en la lista de origen de datos. Si no aparece, instale el controlador TWAIN en Windows 95 y repita el paso 3 para ver si está instalado correctamente. (Si sigue sin poder encontrar el nombre del modelo de su escáner, consulte a proveedor de su escáner para que le informe sobre cómo instalar correctamente el controlador TWAIN en Windows 95.)

5. 	En el menú Archivo, seleccione ”Adquirir: Imagen”.

6. 	Especifique el destino de la imagen adquirida, el esquema de calibración y seleccione la opciones de procesamiento posterior.

7. 	Haga clic en Adquirir para comenzar a digitalizar.

{button ,ALink(Reference1, 0, ””, troub)} Otros problemas frecuentes al digitalizar con escáner


Si obtiene un "mensaje de error de TWAIN"...
Si obtiene un ”mensaje de error de TWAIN”...

Hay tres sistemas que interactúan entre si cuando captura una imagen: el dispositivo de entrada compatible con TWAIN, el controlador de TWAIN y la aplicación compatible con TWAIN. Cada uno de ellos tiene una serie de condiciones propia que se deben cumplir para poder digitalizar una imagen con éxito. La mayoría de las veces el controlador de TWAIN no suele estar bien instalado y eso es lo que causa el problema. Haga las pruebas siguientes antes de acudir a su proveedor para solucionar el problema.

1. 	Asegúrese de que llegue corriente a la cámara o al escáner e inténtelo de nuevo.

2. 	Chequee la conexión entre su ordenador y la cámara o escáner, y vuelva a intentarlo.

3. 	En el menú Archivo, seleccione ”Adquirir: Seleccionar origen” para ver si el nombre de su origen de datos está en la lista. Si está, selecciónelo. De lo contrario, instale el controlador de TWAIN y vuelva a intentarlo.

4. 	Si sigue sin funcionar, contacte a su proveedor para obtener información sobre cómo instalar el controlador de TWAIN o una versión actualizada en Windows 95 y cómo evitar conflictos de hardware con el adaptador de interfaz.

{button ,ALink(Reference1, 0, ””, troub)} Otros problemas frecuentes al digitalizar con escáner

{button ,ALink(phots, 0, ””, troub)} Otros problemas usuales de las cámaras digitales


Si la calidad de las imágenes digitalizadas es pobre y aparecen llenas de líneas horizontales...

Probablemente su escáner no está bien calibrado. Se llama calibración al proceso de ajustar el escáner para que considere las diferencias existentes entre el monitor, el escáner y la impresora. Intente lo siguiente:

  	Ejecute el test de calibración del escáner y otras rutinas de software suministradas por su proveedor. Asegúrese de que el escáner esté configurado correctamente.

  	Para escáneres de mano, pruebe a digitalizar más despacio y con mano firme. Asegúrese de que la imagen que va a digitalizar está en una superficie plana.

{button ,ALink(Reference1, 0, ””, troub)} Otros problemas usuales al digitalizar con escáner


Si la imagen digitalizada tiene muchas manchas...

Las imágenes que requieren muchos colores deben digitalizarse con una resolución mayor para mezclar los colores más suavemente.

1. 	Compruebe la resolución de su escáner. Posiblemente sus parámetros son demasiado bajos para el dispositivo de salida.

2. 	Compruebe la configuración de su monitor. Si está en el modo de 256 colores, cambie a modo de color de alta densidad (16 bits) o a color verdadero (24 bits) para obtener 16,7 millones de colores.

  Cómo calcular la resolución para dispositivos de salida

  Cuánta resolución es suficiente

{button ,ALink(Reference1, 0, ””, troub)} Otros problemas frecuentes al digitalizar con escáner


Si los colores de la imagen digitalizada no son los correctos...

La mayoría de los escáneres planos digitalizan las imágenes utilizando el rojo, el verde y el azul como fuentes de luz, pero casi todas las impresoras generan imágenes utilizando tintas de color cían, amarillo, magenta y negro. Al trasladar una imagen de un sistema a otro se podrían alterar los colores, obteniéndose un resultado inaceptable. Incluso cuando se trabaja con imágenes monocromáticas, podrían perderse detalles visibles en las sombras y áreas brillantes, al imprimir. Ejecute el test de calibración del escáner y otras rutinas de software suministradas por su proveedor. Asegúrese de que tiene la configuración correcta.

{button ,ALink(Reference1, 0, ””, troub)} Otros problemas frecuentes al digitalizar con escáner


Si la imagen digitalizada tiene bordes dentados y le faltan detalles...

Este problema se debe frecuentemente a que la resolución usada para digitalizar es demasiado baja. Como durante el proceso de digitalización se pierde siempre información, usando una resolución baja se detectan incluso menos datos de la imagen. Chequee los parámetros de la resolución, pues puede que tenga que aumentarlos.

  Cómo calcular la resolución para dispositivos de salida

  Cuánta resolución es suficiente

{button ,ALink(Reference1, 0, ””, troub)} Otros problemas frecuentes al digitalizar con escáner


Si la imagen digitalizada se ve demasiado grande o demasiado pequeña en la pantalla...

La forma en que las imágenes aparecen en la pantalla depende de configuración de la resolución del monitor. Para cambiar la resolución de su pantalla:

1. 	Pulse el botón derecho del ratón en un espacio vacío de su escritorio.

2. 	En el cuadro de diálogo de Propiedades de la pantalla en Windows, seleccione la ficha de configuración.

3. 	En el área de escritorio, arrastre el deslizador hacia resolución alta para imágenes de tamaño pequeño y hacia resolución baja para las de tamaño grande.

  Cómo calcular la resolución para dispositivos de salida

  Cuánta resolución es suficiente

{button ,ALink(Reference1, 0, ””, troub)} Otros problemas frecuentes al digitalizar con escáner


Si la imagen digitalizada tiene sombras de otras imágenes...

Puede deberse a que la última imagen que digitalizó era de semitonos o a que acaba de cambiar el tamaño. Siga los siguientes consejos:

  	Evite agudizar cuando utilice semitonos.

  	Digitalice imágenes de semitonos en la posición correcta para no tener que girarla después de la digitalización.

  	Seleccione difusión de semitonos para digitalizar imágenes convertidas a semitonos cuando vaya a usar una impresora como dispositivo de salida.

  	Disminuya ligeramente la resolución al digitalizar escalas de grises o imágenes de color.

  	Coloque una o más láminas de protección al digitalizar originales. Ponga la imagen con la cara para abajo sobre la lámina protectora.

  	Pruebe a ajustar a escala la imagen en el escáner para cambiar su tamaño antes pasarla a una aplicación.

{button ,ALink(Reference1, 0, ””, troub)} Otros problemas frecuentes al digitalizar con escáner


Si la digitalización de una imagen está tardando demasiado...

La duración del proceso de digitalización depende del tamaño del archivo resultante de la imagen que se digitaliza, de la configuración del escáner, y de los parámetros de configuración de la memoria RAM, de la CPU, de la unidad de disco duro y de la velo De los pasos siguientes para controlar la velocidad sin cambiar la configuración del ordenador:

1. 	Chequee el tamaño del archivo de la imagen predigitalizada. Los archivos gran tamaño necesitan más tiempo de procesamiento.

2. 	Seleccione sólo la porción que precise.

3. 	Seleccione la resolución más adecuada.

  De ser posible límite el tamaño de la imagen

  Cómo calcular la resolución para dispositivos de salida

  Cuánta resolución es suficiente

{button ,ALink(Reference1, 0, ””, troub)} Otros problemas frecuentes al digitalizar con escáner


Cuánta resolución es suficiente

Un factor importante para determinar la resolución adecuada para digitalizar, es la relación que se establece entre su escáner y el dispositivo de salida que se va a usar. Puede guiarse por lo siguiente:

  	Digitalice teniendo en cuenta el dispositivo de salida que se va a usar. Para pantalla use de 72 ppp (Fuentes grandes) a 96 ppp (Fuentes pequeñas), para impresora láser de 300 a 600 ppp, y de 1200 a 2400 para calidad fotográfica.

  	Cuando vaya a procesar muchas imágenes, digitalice con una resolución alta (2 veces la original) para disponer de la mayor cantidad de información posible.

  	Digitalice con una resolución alta cuando vaya a ampliar la imagen digitalizada.

  	Cuando vaya a llevar el archivo a una imprenta para crear semitonos, digitalice con una vez y media o dos veces más de líneas de pantalla por pulgada que las que espera que tenga el producto final.

{button ,ALink(Reference,0, ””, troub)} Otros consejos para digitalizar con escáner


Si la imagen digitalizada es demasiado clara o demasiado oscura...

1. 	Si su escáner tiene un control de brillo, utilícelo para ajustar el brillo. Si no tiene este control o si después de ajustarlo el resultado no es satisfactorio, continúe con el siguiente paso.

2. 	Compruebe la calibración de su escáner para ajustar la diferencia de color entre su escáner y el dispositivo de salida.

3. 	Ejecute el test de calibración del escáner y otras rutinas de software suministradas por su proveedor.

{button ,ALink(Reference1, 0, ””, troub)} Otros problemas frecuentes al digitalizar con escáner


Cómo calcular la resolución para los dispositivos de salida

Para elegir la resolución adecuada hay que tener en cuenta la relación entre su escáner y el dispositivo de salida. Los escáneres reproducen escalas de grises y variaciones de colores aumentando la cantidad de datos por píxel (o punto) de las imágenes. Las impresoras, sin embargo, simulan escalas de grises y variaciones de colores agrupando puntos en celdas de semitonos. La impresoras láser generan 53 celdas de semitonos por pulgada, los equipos de imprenta de alta resolución imprimen hasta 133 celdas de semitonos por pulgada. Mientras que los puntos de impresión suelen medirse en puntos por pulgada (ppp), las celdas de semitonos se miden en líneas por pulgada (lpp). Use esta fórmula para calcular la resolución que debe usar al digitalizar imágenes de escala de grises o de color para su dispositivo de salida.

1. 	Multiplique por 1,5 el valor de líneas por pulgada de su dispositivo de salida.

2. 	Use ese resultado como valor de puntos por pulgada (ppp) para su escáner. Por ejemplo, si su dispositivo de salida es una impresora láser habrá que multiplicar 53 x 1.5 para conseguir el valor de puntos por pulgada para el escáner. En este caso, el número de puntos por pulgada adecuado es 80. (Redondee decimales.)

{button ,ALink(Reference, 0, ””, troub)} Otros consejos para digitalizar con escáner


Ventajas de un escáner interno de 30 bits en comparación con uno de 24 bits.

Algunos escáneres tienen una capacidad de digitalización de 30 bits para las imágenes de color y de 10 bits para las de escalas de grises. Esta función permite capturar datos adicionales de la imagen que se digitaliza.

  	Los datos capturados adicionalmente hacen que se logre una imagen de mejor calidad. Sin embargo, la mayoría de los programas, incluyendo iPhoto Plus 4, soportan únicamente archivos de 24 bits.

  	Se captura mejor el detalle de la sombra, lo cual resulta útil cuando se digitalizan imágenes oscuras. También mejora los resultados cuando la imagen original ha sido hecha con mala iluminación.

Se minimizan los vacíos resultantes del proceso de mapeado de tono.

{button ,ALink(Reference, 0, ””, troub)} Otros consejos para digitalizar con escáner


Al digitalizar, los tonos de la imagen original son asignados a un mapa de tonos modificados en la imagen digitalizada. Cuando el rango de tonos de entrada es inferior al rango de tonos de salida hace que aparezcan vacíos en el mapeado de la imagen digitalizada. Estos vacíos alteran los colores de la imagen digitalizada y resultan especialmente visibles en imágenes de escala de grises. En un escáner interno de 30 bits, el rango de tonos de entrada excede el rango de tonos de salida impidiendo la formación de vacíos en el proceso de mapeado, con lo cual la imagen digitalizada tiene tonos más continuos y de alta resolución.


Crear un área adicional en torno a la imagen digitalizada.

Después de adquirir una imagen, puede que desee añadir espacio alrededor de la imagen para marcos, sombras, información etc. Proceda de la manera siguiente:

1. 	Capture la imagen usando la tarea Digitalizar o Importar en la sección Inicio de iPhoto Plus 4.

2. 	Tan pronto como iPhoto Plus 4 termina la captura, la desplaza a la sección Ajustar. Haga clic en ”Marco y sombra”.

2. 	Seleccione un color o textura para el cuadro y elija la anchura.

3. 	Seleccione el color y la dirección de la sombra.

4. 	Aumente el offset de X para ampliar la sombra en sentido horizontal. Redúzcalo para obtener una sombra más pequeña.

5. 	Aumente el offset de Y para ampliar la sombra en sentido vertical. Redúzcalo para obtener una sombra más pequeña.

7. 	Haga clic en OK.

iPhoto Plus 4 cambia el tamaño de la imagen para incluir los elementos añadidos.

{button ,ALink(Reference2, 0, ””, troub)} Otros procedimientos posteriores a la digitalización


Cambiar el color de fondo o el color frontal de la imagen.

Puede que quiera que parte de la imagen aparezca con un fondo o en un conjunto diferente. Esta es una forma de cambiar los colores de fondo o frontales.

1. 	Capture la imagen usando la tarea Digitalizar o Importar en la sección Inicio de iPhoto Plus 4.

2. 	Tan pronto como iPhoto Plus 4 termina la captura, la desplaza a la sección Ajustar. Haga clic en ”Realzar” para cambiar a la sección Realzar.

3. 	Haga clic en ”Seleccionar” para elegir una herramienta de selección y seleccione el área que quiera utilizar de fondo. (Si resulta demasiado difícil seleccionar el fondo, intente seleccionar el resto. Pulse el botón derecho del ratón sobre la imagen y elija ”Invertir” para intercambiar la selección.

3. 	Pulse Ctrl+F para abril el cuadro de diálogo Rellenar y seleccione un color o motivo para el fondo.

{button ,ALink(Reference2, 0, ””, troub)} Otros procedimientos posteriores a la digitalización


Añada color a mis imágenes de blanco y negro.
Añada color a mis imágenes de blanco y negro / escala de grises.

A veces el añadir una chispa de color a una imagen en blanco y negro o de escala de grises logra enfatizar extraordinariamente un detalle imperceptible. Puede hacerlo de la siguiente manera:

1. 	Abra la imagen en el área de trabajo de iPhoto Plus 4.

2. 	Del menú Foto seleccione ”Tipo de datos” y del submenú, seleccione ”Color verdadero”. Esto convierte su imagen a color pleno.

3. 	Haga clic en ”Realzar” par cambiar a la sección Realzar y use las herramientas de pintura para colorear su imagen.

{button ,ALink(Reference2, 0, ””, troub)} Otros procedimientos posteriores a la digitalización


Unir dos imágenes

Si su imagen completa no cabe en un marco, intente dividirla en partes dejándoles una solapa, para unir luego las piezas siguiendo estas indicaciones:

1. 	Asegúrese de que las dos imágenes que desea unir estén abiertas y de que sean del tipo escala de grises o RGB color verdadero.

2. 	Seleccione una de las imágenes para unir. (Es indiferente cuál de las dos.)

3. 	Del menú Edición, seleccione ”Unir”.

4. 	A continuación seleccione la otra imagen.

5. 	Arrastre las imágenes de modo que queden en el orden correcto.

6. 	Seleccione la opción Manual y marque la opción ”Afinar automáticamente”.

7. 	Presione la tecla Mayús y haga clic en un punto de referencia en la imagen original.

8. 	Presione la tecla Mayús y marque el punto de referencia en la otra imagen que quiera que esté cerca del punto seleccionado en el paso 7.

9. 	Haga clic en OK.

{button ,ALink(Reference2, 0, ””, troub)} Otros procedimientos posteriores a la digitalización


Si la imagen que va a digitalizar es demasiado grande para su escáner...

Si quiere digitalizar una imagen que no cabe en su escáner, divídala en porciones y utilice luego iPhoto Plus 4 para unir las partes.

  Unir dos imágenes

{button ,ALink(Reference1, 0, ””, troub)} Otros problemas frecuentes al digitalizar con escáner


  Si tiene problemas para hacer funcionar a su escáner con iPhoto Plus 4...

  Si obtiene un ”mensaje de error de TWAIN”...

  Si la imagen que va a digitalizar es demasiado grande para su escáner...

 Si la imagen digitalizada se ve demasiado grande o demasiado pequeña en la pantalla...

  Si la imagen digitalizada es demasiado clara o demasiado oscura...

  Si los colores de la imagen digitalizada no son los correctos...

  Si la imagen digitalizada tiene muchas manchas...

  Si la calidad de la imagen digitalizada es pobre y está llena de líneas horizontales

  Si la imagen digitalizada tiene bordes dentados y le faltan detalles...

  Si la imagen digitalizada tiene sombras de otras imágenes...

  Si la digitalización de una imagen está tardando demasiado...


  Digitalice con el mismo color que usa el dispositivo de salida.

  Digitalice imágenes y textos de buena calidad

  Digitalice fotografías en vez de imágenes impresas.

  De ser posible limite el tamaño de la imagen

  La resolución más alta no es siempre la mejor.

  Cuánta resolución es suficiente

  Cómo calcular la resolución para dispositivos de salida

  Experimente con configuraciones diferentes

  Ventajas de un escáner interno de 30 bits en comparación con uno de 24 bits.


  Crear un área adicional en torno a la imagen digitalizada.

  Cambie el color de fondo o de frente

  Añadir color a mi imagen en blanco y negro o de escala de grises

  Unir dos imágenes


Fotografíe de cerca

No fotografíe los motivos desde lejos. A diferencia de las cámaras normales, las cámaras digitales tienen fija la resolución. Si el motivo que fotografía está a más de 30 pies de distancia, no aparecerá claro en la fotografía. Como norma, una distancia de 5 a 15 pies es la mejor para sacar fotos digitales.

{button ,ALink(pho, 0, ””, troub)} Otros consejos para fotografiar


  Asegúrese de que dispone de la iluminación adecuada

  Fotografíe de cerca

  Evite fotografiar documentos o bloques de texto extensos.

  De ser posible limite el tamaño de la imagen

  Enfoque de la cámara


  Si su cámara no funciona...

 Las pilas están bien, pero la cámara sigue sin disparar...

  Las pilas parecen agotarse demasiado rápido...

  Si obtiene un ”mensaje de error de TWAIN”...


Asegúrese de que dispone de la iluminación adecuada

Al igual que en la fotografía normal, también en la fotografía digital la iluminación es de suma importancia. Si el motivo es demasiado oscuro para su cámara normal, también lo será para la cámara digital. Además, a diferencia de las cámaras normales, la mayor parte de las cámaras digitales no permiten cambiar la velocidad de obturación, así que, en entornos oscuros, no es posible prolongar el tiempo de exposición. Vea las instrucciones de su cámara para conocer los requisitos para obtener la iluminación más adecuada.

{button ,ALink(pho, 0, ””, troub)} Otros consejos para fotografiar


Enfoque de la cámara

Muchas cámaras digitales disponen de enfoque automático avanzado para que capture las mejores fotos posibles con el menor esfuerzo. Algunas veces, la iluminación u otras condiciones dificultan que su cámara enfoque con eficiencia. A continuación puede ver varias formas para hacer las fotos más claras posibles:

  	Contraste bajo, Retroiluminación fuerte, o Reflexión brillante Si se da una de estas condiciones, enfoque otro motivo que esté aproximadamente a la misma distancia de usted y fije el foco en ese motivo. Dirija luego el foco hacia el motivo inicial y saque la foto. (Consulte el manual de usuario de su cámara para saber cómo fijar el foco.)

  	Líneas paralelas Si su motivo consta de muchas líneas horizontales (por ejemplo peldaños de una escalera), gire la cámara 90 grados para enfocar. Luego vuelva a poner la cámara en el ángulo correcto y saque la foto.

  	Distancias múltiples Si los motivos de su foto están a distancias diferentes, enfoque el que sea más importante para la foto. (Si enfoca un punto entre dos de los motivos, es muy probable que ambos queden fuera de foco.

{button ,ALink(pho, 0, ””, troub)} Otros consejos para fotografiar


Si su cámara no funciona...

Es probable que sólo sea una insignificancia lo que le está impidiendo su uso. Chequee lo que se indica a continuación para comprobar que todo está en orden:

1. 	¿Están bien instaladas y cargadas las pilas? Compruébelo y cámbielas si es necesario. Es recomendable llevar un juego de pilas de repuesto cargadas cuando usa la cámara. (Nota: Reemplace siempre todas las pilas con un juego de pilas cargadas completamente. Reemplazando sólo algunas de las pilas de modo que tengan diferente nivel de carga puede hacer que la cámara funcione con inestabilidad y acortar la vida de las pilas.

2. 	¿Está usando el tipo de pilas correcto? Consulte el manual de usuario de su cámara para estar seguro de que está usando el tipo de pilas correcto.

3. 	Los contactos entre las pilas y la cámara están sucios. Saque las pilas y limpie los contactos y las pilas con cuidado utilizando un paño limpio y seco. Vuelva a colocar las pilas en su compartimento.

{button ,ALink(phots, 0, ””, troub)} Otros problemas usuales de las cámaras digitales


Las pilas están bien, pero la cámara sigue sin disparar...

Chequee si su cámara está bien ajustada para hacer fotos siguiendo estos pasos:

1. 	Compruebe si la tapa del objetivo está abierta.

2: 	Mire si el dispositivo de almacenamiento está bien insertado en la cámara.

3. 	Compruebe si hay suficiente espacio para otra foto en el dispositivo de almacenamiento. (Es recomendable llevar siempre consigo al menos un dispositivo de almacenamiento de repuesto.)

4. 	Si piensa tomar fotos en interiores con flash, asegúrese de que el flash esté completamente cargado. La mayor parte de las cámaras tienen un indicador que muestra cuándo el flash está recargando y cuándo está listo para usar.

{button ,ALink(phots, 0, ””, troub)} Otros problemas usuales de las cámaras digitales


Las pilas parecen agotarse demasiado rápido...

El tiempo que tardan las pilas en agotarse depende de varios factores: Estas son algunos de los puntos a los que debe prestar atención:

  	Temperatura Las pilas se gastan más rápidamente cuando se exponen a temperaturas extremas. Si saca fotos en un ambiente extremadamente cálido o a temperaturas bajo cero, las pilas se gastarán más rápido. Algunas cámaras pueden utilizar pilas especiales para estos casos. Consulte el manual de su cámara para ver más información al respecto.

  	Pilas mal cargadas Si se recargan las pilas gastadas sólo parcialmente se acorta la duración de la carga. Descargue las baterías por completo antes de cargarlas de nuevo.

  	Pilas viejas Si no ha usado las pilas por un periodo de tiempo prolongado puede que la carga esté ”pasada”. Descárguelas y vuélvalas a cargar para ”renovar” la carga.

  	Pilas muertas Si ha usado las mismas pilas muchas veces, es posible que ya no puedan retener la carga. Compre un juego de pilas recargables nuevo.

{button ,ALink(phots, 0, ””, troub)} Otros problemas usuales de las cámaras digitales


Sacar fotos usando el flash

Sacar fotos con flash es muy fácil con las cámaras modernas. Aún así, hay algunos trucos que deberá aprender para sacar las mejores fotos posibles.

  	Cómo evitar el efecto de ”Ojos rojos” Los ”ojos rojos” se producen cuando los ojos de la persona o animal que se fotografía se adaptan con dificultad al cambio de luz producido por el flash. Existen algunas formas de corregirlo. Primero, si su cámara tiene la función ”no ojos rojos”, úsela cuando tome fotos con flash. Esta función hace que el flash de una luz intermitente rápida antes de disparar la foto, permitiendo que los ojos de la persona o animal fotografiados se adapten a la luz. Si su cámara no dispone de esta función, use la función ”Ojos rojos” del grupo Ajustar en iPhoto Plus 4 para corregir el problema después de haber tomado la foto.

  	Fotos desvanecidas Los fotógrafos profesionales tratan de no tomar fotos con flash solamente. Esto se debe a que el flash normalmente crea sombras indeseadas haciendo que se desvanezcan otras partes importantes de la foto. Se puede evitar este problema con luces suplementarias y difundiendo la luz a través de grandes retículas. Pero para la mayor parte de la gente éste es un método costoso y complicado. iPhoto Plus 4 ofrece una alternativa: utilice Balance de color y los comandos Tono y Saturación de la tarea Colores del grupo Ajustar para retocar la foto.

  	Sacar fotos a través del cristal Evite sacar fotos con flash a través de un cristal u otras superficies que reflejan enfocando de frente. La luz del flash probablemente hará que el motivo de su foto aparezca poco claro y con toda seguridad en su foto aparecerá una mancha de brillo. Puede evitarlo disparando esta clase de fotos desde un ángulo. Los mejores resultados los obtendrá disparando las fotos desde un ángulo superior a 60 grados.

{button ,ALink(pho, 0, ””, troub)} Otros consejos para fotografiar