/*****************************************************************************/
/*     Beschreibung:                                                         */
/*     Help File für SPEAKER  ( Warnungen )                                  */
/*     Jeder Help Text beginnt mit der Kombination '#@'. Bündig daran        */
/*     anschließend folgt ein Identifikationsstring. Jeder Helptext muß      */
/*     durch '#@' eingeschlossen werden. Der Helptext darf nicht größer als  */
/*     73 Zeichen breit und 22 Zeichen hoch sein.                            */
/*     Kommentare können mit '#~' eingeleitet werden. Kommentare schließen   */
/*     ebenso wie '#@' einen Helptext ab.                                    */
/*****************************************************************************/
#@0000
                            Attention
      The VAS variable has not been correctly initialised.
                      (Equivalent volume)

Without those parameters the operation can not be carried out.
              Initialize the parameter and repeat the last
                        operation.

               values : > 0 Liter
#@0001
                            Attention
      The variable FMS has not been correctly initialized.
                  (Resonance frequency)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.
         values : > 0 Hz
#@0002
                            Attention
       The variable QMS has not been correctly initialized.
                      (mechanical Q factor)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.
                    values : > 0
#@0003
                            Attention
The variable QES has not been correctly initialized.
                      (electrical Q factor)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.


                    values : > 0
#@0004
                            Attention
The variable RDC has not been correctly initialized.
                (ohmic resistance)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.


                     values : > 0 Ω
#@0005
                            Attention
The vairable SPL has not been correctly initialized.
                       (Sound pressure level)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.
                       value : > 60 db
#@0006
                            Attention
The variable SD has not been correctly initialized.

                        (effective piston area)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                     values : > 0 cm²
#@0007
                             Attention
The variable MMS has not been correctly initialized.
                         (moved mass)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                     values: > 0 gr
#@0008
                             Attention
The variable CMS has not been correctly initialized.
                         (damper tension)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.
                     values : > 0 mm/N
#@0009
                             Attention
The variable BL has not been correctly initialized.
                         (magnetic drive)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                     values : > 0

#@000A
                             Attention
The variable LE has not been correctly initialized.
                         (inductivity)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                     values : > 0 mH
#@000B
                             Attention
The variable HUB has not been correctly initialized.
                         (cone displacement)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                   values : > 0 mm
#@0010
                             Attention
The variable QL has not been correctly initialized.
                         (loss factor)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                     values : > 0
#@0011
                         Attention
The variable KOR has not been correctly initialized.
                  (vent correction factor)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                     values : > 0
#@0012
                             Attention
The variable TFL has not been correctly initialized.
                         (port area)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                     values : > 0 cm²
#@0013
                             Attention
The variable F1 has not been correctly initialized.
            (lower cut-off frequency bandpass)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                     values : > 0 Hz
#@0014
                             Attention
The variable F2 has not been correctly initialized.
             (higher cut-off frequency bandpass)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                 values : > 0 Hz und > F1
#@0015
                             Attention
The variable FL has not been correctly initialized.
       (lower cut-off frequency horn enclosure)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.
                    values : > 0 Hz
#@0016
                             Attention
The variable FH has not been correctly initialized.
      (higher cut-off frequency horn enclosure)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

               values : > 0 Hz und > FL
#@0017
                             Attention
The variable KV has not been correctly initialized.
       (Coupling volume bandpass enclosure)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                   values : > 0 Liter
#@0018
                             Attention
The variable VB has not been correctly initialized.
                         (Net volume)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                   values: > 0 Liter
#@0018
                             Attention
The variable VB has not been correctly initialized.
                         (Net volume)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                   values : > 0 Liter
#@0019
                             Attention
The variable FB has not been correctly initialized.
                         (Tuning frequency)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                   values : > 0 Hz
#@0020
                             Attention
The variable FU has not been correctly initialized.
         (Lower cut-off frequency crossover)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.


                   values : > 0 Hz
#@0021
                             Attention
The variable FO has not been correctly initialized.
        (Higher cut-off frequency crossover)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

               values : > 0 Hz und > Fu
#@0022
                             Attention
The variable A has not been correctly initialized.
             (Crossover damping factor)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                   values : > 0 db
#@0023
                             Attention
The variable Z has not been correctly initialized.
              (Crossover load resistance)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.
                   values : > 0 Ω
#@0024
                             Attention
The variable R1 has not been correctly initialized.
                         (Series resistor)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.
                   values : > 0 Ω
#@0025
                             Attention
The variable R2 has not been correctly initialized.
                         (Parallel resistor)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                  values : > 0 Ω
#@0026
                             Attention
The variable VF has not been correctly initialized.
             (Vented bandpass volume)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.
                   values : > 0 Liter
#@0027
                             Attention
The variable ZO has not been correctly initialized.
     (Load resistance higher cut-off frequency)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.


                   values : > 0 Ω
#@0030
                 Attention
The filter type is not correct.

Determine the filter once again.
The calculation is aborted !
#@0031
                             Attention
The variable MVL has not been correctly initialized.
           (Net volume spl measurement)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                   values : > 0 Liter
#@0032
                             Attention
The variable F_MESS has not been correctly initialized.
       (Test-frequency for inductivity measurement)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.
                   values : > 0 Hz
#@0040
              Attention
           No file name entered.

Enter file name.
#@0041
              Attention
         Unable to open file.
#@0042
               Attention
       No configuration file found.
#@0050
                             Attention
The variable WIDTH has not been correctly initialized.
                         (Vent width)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                   values : > 0 cm
#@0051
                             Attention
The variable HEIGHT has not been correctly initialized.
                         (Vent height)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                   values : > 0 cm
#@0052
                             Attention
The variable DIA. has not been correctly initialized.
                         (Vent diameter)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                   values : > 0 cm
#@0053
                             Attention
The variable SPAN has not been correctly initialized.
                (Chipboard thickness)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                   values : > 0 cm
#@0053
                             Attention
The variable WIDTH has not been correctly initialized.
                        (Chipboard width)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.
                   values : > 0 cm
#@0054
                             Attention
The variable HEIGHT has not been correctly initialized.
                         (Chipboard height)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                   values : > 0 cm
#@0060
                             Attention
The variable ZRES has not been correctly initialized.
                         (Impedance at resonance)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                  values : > 0 Ω
#@0061
                             Attention
The variable F1 has not been correctly initialized.
               (Lower cut-off frequency)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                  values : > 0 Hz und < FMS
#@0062
                             Attention
The variable F2 has not been correctly initialized.
            (Higher cut-off frequency)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.
             values : > 0 Hz und > FMS und > F1
#@0063
                             Attention
The variable D has not been correctly initialized.
                         (Cone diameter)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.
                     values : > 0 cm
#@0064
                             Attention
The variable FS_NEU has not been correctly initialized.
               (New resonance frequency)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.
                     values : > 0 Hz
#@0065
                             Attention
The variable ZRES_NEU has not been correctly initialized.
                  (New  maximum impedance)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.

                      values : > 0 Ω
#@0066
                             Attention
The variable MA has not been correctly initialized.
                         (Additional mass)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.  

                      values : > 0 gr
#@0067
                             Attention
The variables F1 and F2 have not been correctly initialized.
The error occurs in the following cases:



           F1 > FMS oder F2 < FMS oder F1 > F2
#@0068
                             Attention
The variable FS_NEU has not been correctly initialized.
                (New resonance frequency)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.


              values : > 0 Hz and > FMS
#@0069
                             Attention
The variable FS_NEU has not been correctly initialized.
                 (New resonance frequency)

Without this parameter the operation can not be carried out.
Initialize the parameter and repeat the last operation.
              values : > 0 Hz and < FMS

#@0080
                            Attention
The enclosure description consists of contradictory statements.
The input parameters are not complete.

The enclosure description will not be accepted.

                            Procedure
                            =========

Please use the "New enclosure" menu and enter the parameters
completely, or use the "Take over enlosure" command and enter
the missing parameters.
#@
